Tabella 1: Caratteristiche dei ricevitori disponibili.

Ricevitore  (O.L.)_{vertexroom}  I.F.  Banda Passante † T_{sys} allo zenith  G  E λ/D
ν_{sint}  Amp T_{cal}Left T_{cal}Right  N  ν_{off}  ν_{min}  ν_{max}  ν_{min}  ν_{max}  Left Right
FNOM LEVEL MARK1 MARK1 MULT OFFSET IFMIN IFMAX FMIN FMAX
(GHz) (cm) (MHz) (dBm) (K) (K) (MHz) (MHz) (GHz) (K) (K/Jy) % (′)

RICEVITORI A FUOCO SECONDARIO

43  0.7  7  40.00  49.00
22  1.3  1156  16  32.5  -  19  216  496  22.18  22.46  120  -  .110 38 1.4
12  2.5  1192  4  9.2  10  150  350  12.07  12.27  194  182  .13  45 2.7
10.7  2.8  1145  13  6.95  7.91  9  195  495  10.5  10.8  55  65  .152 52 3.0
6 ‡  5  1441  6.1  28.4  34.9  4  240  340  6.00  6.10  143  118  5.4
1595  7.0  33.3  29.8  4  240  340  6.62  6.72  131  145  4.8
5  6  1150  14  6.8  6.8  4  100  450  4.70  5.05  46  52  .169 58 6.4
1.6  18  1295  15  11.5  9.9  1  327  407  1.62  1.70  100  140  .100 35 19.3
1.4  21  1036  14  11.0  1  327  407  1.36  1.44  100  22.6

RICEVITORI A FUOCO PRIMARIO

22  1.3 1735.5  19.9  31.7  30.2  8  8080  100  508  21.86  24.14  92  209  .110 38 1.4
1710  19.9  34.2  8  8080  88
1757  19.9  31.7  8  8080  95
1804  19.9  31.7  8  8080  102
1851  19.9  35.8  8  8080  98
1898  19.9  33.0  8  8080  99
1945  19.9  28.0  8  8080  110
8.3  3.6  2020  8.8  11.3  4  100  500  8.18  8.58  39  37  .141 48 3.9
2.3  13  2020  13.5  18.9  1  180  340  2.20  2.36  50  50  .125 43 14

(†) ν_{min} = ν_{if,min} + ν_{OL} ; ν_{max} = ν_{if,max} + ν_{ol} ; ν_{OL} = N ν_{sint} ( + ν_{off}) (‡) Tale ricevitore è efficiente solo nei due intervalli di frequenza listati.